Seal of Urbanus
source date: 6th C. VIe s.
availability: Creative Commons Attributions-NonCommercial-ShareAlike 4.0 International License. (https://creativecommons.org/licenses/by-nc-sa/4.0/)

Urbani

Urbani

Urbani.

(Seal of) Urbanus.

(Sceau d')Urbanus.