Seal of George, imperial vestitor
source date: 7th C., end- 8th C., beginning VIIe s., fin- VIIIe s., début
availability: Creative Commons Attributions-NonCommercial-ShareAlike 4.0 International License. (https://creativecommons.org/licenses/by-nc-sa/4.0/)

Θεοτόκε βοήθει

Γεωργίο βασιλικῷ βεστύτωρι

Θεοτόκε βοήθει / Γεωργίο βασιλικῷ βεστύτωρι.

Mother of God help George, imperial vestitor.

Mère de Dieu aide Georges, vestitor impérial.

Bibliothèque Nationale de France, Paris, [...], 75 .